180˚

180˚

225˚

225˚

270˚

270˚

315˚

315˚

0˚

0˚

45˚

45˚

90˚

90˚

135˚

135˚

180˚

180˚

-90˚ -90˚

-60˚ -60˚

-30˚ -30˚

0˚ 0˚

30˚ 30˚

60˚ 60˚

90˚ 90˚

0.3˚C peak-to-peak amplitude interdecadal (Group C)