-180˚ -150˚ -120˚ -90˚ -60˚ -30˚ 0˚ 30˚ 60˚ 90˚ 120˚ 150˚ 180˚ 20˚

40˚

60˚

80˚

+2˚C per century -2˚C per century b) change in amplitude

GFDL Annual Cycle