Record Variable Lat Lon Begin Trop Reference Instrumental 1. Gridded temperature Temp 42.5N 92.5W 1820 Jones & Bradley 1992 2. ” Temp 47.5N 2.5E 1757 ” 3. ” Temp 47.5N 7.5E 1753 ” 4. ” Temp 47.5N 12.5E 1767 ” 5. ” Temp 47.5N 12.5E 1775 ” 6. ” Temp 52.5N 17.5E 1792 ” 7. ” Temp 57.5N 17.5E 1756 ” 8. ” Temp 57.5N 17.5E 1752 ” 9. ” Temp 62.5N 7.5E 1816 ” 10. ” Temp 62.5N 12.5E 1761 ” 11. ” Temp 62.5N 42.5E 1814 ” 12. Gridded Precip Precip 12.5N 82.5E 1813 x ” 13. ” Precip 17.5N 72.5W 1817 x ” 14. ” Precip 37.5N 77.5W 1809 ” 15. ” Precip 42.5N 2.5E 1749 ” 16. ” Precip 42.5N 7.5E 1804 ” 17. ” Precip 42.5N 7.5E 1770 ” 18. ” Precip 42.5N 7.5E 1813 ” 19. ” Precip 42.5N 7.5E 1805 ” 20. ” Precip 42.5N 7.5E 1697 ” 21. ” Precip 42.5N 7.5E 1809 ” 22. ” Precip 42.5N 7.5E 1785 ” Historical 23. Cent England Temp Temp 52N 0E 1730 Manley 1959 24. Cent Europe Temp Temp 45N 10E 1550 Pfister 1992 Coral 25. Burdekin River (fluoresc) Precip/Runoff 20S 147E 1746 x Lough 1991 26. Galapagos Isabel Island (δ^{18}O) SST 1S 91W 1607 x Dunbar et al 1994 27. Gulf of Chiriqui, Panama (δ^{18}O) Precip 7.5N 81W 1708 x Linsley et al, 1994 28. Gulf of Chiriqui, Panama (δ^{13}C) Ocean Circ x 29. Espiritu Santu (δ^{18}O) SST 15S 167E 1806 x Quinn et al 1993 30. New Caledonia (δ^{18}O) SST 22S 166E 1658 x Quinn et al 1996 31. Great Barrier Reef (band thickness) SST 19S 148E 1615 x Lough, pers. comm. 32. Red Sea (δ^{18}O) SST/Precip 29.5N 35E 1788 x Heiss, 1994 33. Red Sea (δ^{13}C) Ocean Circ x Ice Core 34. Quelccaya summit ice core (δ^{18}O) (air temp) 14S 71W 470 x Thompson, 1992 35. Quelccaya summit ice core (accum) Precip 488 x ” 36. Quelccaya ice core 2 (δ^{18}O) (air temp) 744 x ” 37. Quelccaya ice core 2 (accum) Precip x ” 38. Dunde ice core (δ^{18}O) (air temp) 38N 96E 1606 x Thompson, 1992 39. Southern Greenland ice core (melt) summer temp 66N 45W 1545 Kameda et al, 1996 40. Svalbard ice core (melt) Summer Temp 79N 17W 1400 Tarussov, 1992 41. Penny ice core (δ^{18}O) (air temp) 70N 70W 1718 Fisher et al, 1998 42. Central Greenland stack (δ^{18}O) (air temp) 77N 60W 553 Fisher et al, 1996