1700 1750 1800 1850 1900 1950 2000 Year -4

-2

0

2

4

Anomaly (˚C)

Mann et al NINO3 reconstruction (Oct-Mar) Stahle et al winter SOI reconstruction (inverted and scaled to have the standard deviation of the NINO3 series) Instrumental NINO3 (Oct-Mar, from the UK Met. Office HadISST1.1 dataset)

1800 2000

0

2

4

Fig 2.34

Long-term Behavior of El Nino

(relative to 1961-1990 base period)

Ian Macadam, 3/3/2000.